From 9ecd978e269f28f711080fa66e47c84e6ff08d90 Mon Sep 17 00:00:00 2001
From: Claude Paroz <claude@2xlibre.net>
Date: Sat, 21 Jul 2012 15:38:24 +0200
Subject: Re-added Windows line ending stripped in previous commit

Thanks Aymeric Augustin for noticing the issue.
---
 tests/regressiontests/initial_sql_regress/sql/simple.sql | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'tests/regressiontests/initial_sql_regress/sql/simple.sql')

diff --git a/tests/regressiontests/initial_sql_regress/sql/simple.sql b/tests/regressiontests/initial_sql_regress/sql/simple.sql
index 18fd8a401e..39363baa9a 100644
--- a/tests/regressiontests/initial_sql_regress/sql/simple.sql
+++ b/tests/regressiontests/initial_sql_regress/sql/simple.sql
@@ -6,5 +6,5 @@ INSERT INTO initial_sql_regress_simple (name) VALUES ('Ringo');
 INSERT INTO initial_sql_regress_simple (name) VALUES ('George');
 INSERT INTO initial_sql_regress_simple (name) VALUES ('Miles O''Brien');
 INSERT INTO initial_sql_regress_simple (name) VALUES ('Semicolon;Man');
-INSERT INTO initial_sql_regress_simple (name) VALUES ('This line has a Windows line ending');
+INSERT INTO initial_sql_regress_simple (name) VALUES ('This line has a Windows line ending');
 
-- 
cgit v1.3

